NNN99 Nucleon Decay Working Group

1 Thursday, 23 September

1.1 Working Groups I (main auditorium)

3:35-3:45 Synopsis: Nucleon Decay Group C.K.Jung (Stony Brook)

2 Friday, 24 September

2.1 Working Groups II (main auditorium)

10:55-11:15 Nucleon decay with or without GUT in supersymmetry H.Murayama (Berkeley) 11:20-11:40 Expectations for Nucleon Decay Modes and Branching Ratios K.S.Babu (Oklahoma) 11:45-12:05 Nucleon instability and (B-L) non-conservation Y.Kamyshkov (Tennessee/ORNL) 12:05-1:45 Lunch

2.2 Working Groups III (main auditorium)

1:45-2:05 An idea of a detector using Pb/scintillator calorimeter A.Konaka (TRIUMF) 2:15-2:35 AquaRICH T.Ypsilantis (CERN) 2:45-3:05 Nucleon decay studies in a large Liquid Argon detector M.Campanelli (Zurich) 3:15-3:30 Break 3:30-3:45 Experience w/ SuperK construction K.Nakamura (KEK)

3:55-4:25

Rock Engineering for the Next generation very large Underground Detectors

L.Peterson (CNA Engineering)

4:35-4:50

Feasibility of a Next generation Underground Water Cherenkov Detector (NUWC) C.K.Jung (Stony Brook) 5:00-5:15 Simulation of NUWC detectors I M.Shiozawa (ICRR) 5:25-5:40 Simulation of NUWC detectors II C.McGrew (Stony Brook)

3 Saturday, 25 September

3.1 Working Group Reports II (main auditorium)

3:05-3:40 Nucleon Decay Working Group W.Marciano (BNL) / Y.Suzuki (ICRR)